RC

+RC() +~RC()

<<Singleton>> Configuration

-*s_pInst : Configuration

#Configuration() +getInstance() +~Configuration() +Load() -Prep()

FileOption

+FileOption(**ppvOpts:void) +~FileOption()

EnvironmentOption

+EnvironmentOption(**ppvOpts:void) +~EnvironmentOption()

CommandLineOption

+CommandLineOption(**ppvOpts:void) +~CommandLineOption()

Option

+Parse() +getOpt(in nOptid:int) +putOpt(in nOptid:int, in *pvOptval:void)

Logger

+Logger() +~Logger()

Processor

+Processor() +~Processor()

Script

-eLang : enum = 0 -*szBuf : char +Write(in nDesc:int) +Script() +~Script() +putCommand() +putBlock()

RCFile

+RcFile() +~RcFile()

FuncFile

+FuncFile() +~FuncFile()

SecFile

+SecFile() +getConfig() +getDefault() +getError() +getCommon() +~SecFile()

ConfigSection

+ConfigSection() +~ConfigSection()

DefaultSection

-eLang : enum = 0

+DefaultSection() +~DefaultSection()

ErrorSection

-eLang : enum = 0

+ErrorSection() +~ErrorSection()

CommonSection

-eLang : enum = 0

+CommonSection() +~CommonSection()

UserSection

-eLang : enum = 0 -*szName : char +UserSection() +~UserSection()

Section

-*szCode : char

+Load(*szData:char) -Parse()

Translator

SyntaxTree

SymbolTable

File

-*szName : char

+getName()

Non-persistent Non-serializable.

Processes rcfiles until none left in configuration.

Uses OSSP l2 library for all our logging.

Not to be implemented until a real need is verified.

A Process instance can use more than one RCFile, but contains only one at a time.

A SecFile instance has at most one UserSection even though the rcfile being parsed can have more than one.

RC Configuration

Processor

SecFile Logger

0..1

0..* 0..1

0..1

0..1

0..1 0..1 0..1

0..1

0..1